From 7ab55d005aa7661d1eed6cb0a77ee6b269bfdf91 Mon Sep 17 00:00:00 2001
From: Jan <sentrycraft123@gmail.com>
Date: Sun, 14 Apr 2024 18:01:56 +0200
Subject: chore: Remove Linux checks (#893)

With NorthstarProton changing to be Proton-GE based the glibc requirement is no longer needed since it targets the Steam runtime
---
 src-vue/src/views/DeveloperView.vue | 14 --------------
 1 file changed, 14 deletions(-)

(limited to 'src-vue/src/views/DeveloperView.vue')

diff --git a/src-vue/src/views/DeveloperView.vue b/src-vue/src/views/DeveloperView.vue
index f3847d36..a08c73f3 100644
--- a/src-vue/src/views/DeveloperView.vue
+++ b/src-vue/src/views/DeveloperView.vue
@@ -17,10 +17,6 @@
 
             <h3>Linux:</h3>
 
-            <el-button type="primary" @click="checkLinuxCompatibility">
-                Check NSProton Compatibility
-            </el-button>
-
             <el-button type="primary" @click="installNSProton">
                 Install NSProton
             </el-button>
@@ -210,16 +206,6 @@ export default defineComponent({
             await invoke("force_panic");
             showErrorNotification("Never should have been able to get here!");
         },
-        async checkLinuxCompatibility() {
-            await invoke("linux_checks")
-                .then(() => {
-                    showNotification('Linux compatible', 'All checks passed');
-                })
-                .catch((error) => {
-                    showNotification('Not Linux compatible', error, 'error');
-                    console.error(error);
-                });
-        },
         async launchGameWithoutChecks() {
             let launch_options: NorthstarLaunchOptions = { bypass_checks: true, launch_via_steam: false };
             this.$store.commit('launchGame', launch_options);
-- 
cgit v1.2.3

